\question[1]These are some examples of numerical problems. A 1\si{\kilo\watt} load runs continuously for one day. Find the total energy drawn in \si{\kilo\joule}.
\begin{solutionorbox}[2in]
	Total Energy = Power x time\\
	$=1\si{\kilo\watt}\times24\si{\hour}$\\
	$=1000\si{\watt}\times24\times60\times60\si{\sec}$\\
	$=86400\si{\kilo\joule}$
\end{solutionorbox}

